\[e^{-\pi ia}\Gamma\left(a,ze^{\pi i}\right)-e^{\pi ia}\Gamma\left(a,ze^{-\pi i}%
\right)=-\frac{2\pi i}{\Gamma\left(1-a\right)},\]