\[\frac{{\mathrm{d}}^{2}g}{{\mathrm{d}t}^{2}}+\left(\lambda+\frac{1}{4}+\gamma^{%
2}{\sin}^{2}t-\frac{\mu^{2}-\frac{1}{4}}{{\sin}^{2}t}\right)g=0,\]