\[|\Psi_{1}\left(x\right)|^{2}=\sqrt{\frac{8\pi}{3}}\int_{0}^{\infty}u^{-1/2}%
\cos\left(2u(x+u^{2})+\tfrac{1}{4}\pi\right)\,\mathrm{d}u.\]