\[\frac{{\partial}^{2}u}{{\partial r}^{2}}+\frac{1}{r}\frac{\partial u}{\partial
r%
}+\frac{1}{r^{2}}\frac{{\partial}^{2}u}{{\partial\theta}^{2}}=0\]