\[\mathscr{M}\left(f\right)\left(s\right)=\mathscr{M}\mskip-3.0muf\mskip 3.0mu%
\left(s\right)=\int^{\infty}_{0}x^{s-1}f(x)\,\mathrm{d}x.\]